'*************************************************************************
'
' DO NOT ALTER OR REMOVE COPYRIGHT NOTICES OR THIS FILE HEADER.
' 
' Copyright 2008 by Sun Microsystems, Inc.
'
' OpenOffice.org - a multi-platform office productivity suite
'
' $RCSfile: VBEventListener.cls,v $
'
' $Revision: 1.7 $
'
' This file is part of OpenOffice.org.
'
' OpenOffice.org is free software: you can redistribute it and/or modify
' it under the terms of the GNU Lesser General Public License version 3
' only, as published by the Free Software Foundation.
'
' OpenOffice.org is distributed in the hope that it will be useful,
' but WITHOUT ANY WARRANTY; without even the implied warranty of
' MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
' GNU Lesser General Public License version 3 for more details
' (a copy is included in the LICENSE file that accompanied this code).
'
' You should have received a copy of the GNU Lesser General Public License
' version 3 along with OpenOffice.org.  If not, see
' <http://www.openoffice.org/license.html>
' for a copy of the LGPLv3 License.
'
'*************************************************************************

VERSION 1.0 CLASS
BEGIN
  MultiUse = -1  'True
  Persistable = 0  'NotPersistable
  DataBindingBehavior = 0  'vbNone
  DataSourceBehavior  = 0  'vbNone
  MTSTransactionMode  = 0  'NotAnMTSObject
END
Attribute VB_Name = "VBEventListener"
Attribute VB_GlobalNameSpace = False
Attribute VB_Creatable = True
Attribute VB_PredeclaredId = False
Attribute VB_Exposed = True
Option Explicit
Private interfaces(0) As String
Private bDisposingCalled As Boolean
Private bQuiet As Boolean

Public Property Get Bridge_ImplementedInterfaces() As Variant
    Bridge_ImplementedInterfaces = interfaces
End Property

Private Sub Class_Initialize()
interfaces(0) = "com.sun.star.lang.XEventListener"
bDisposingCalled = False
bQuiet = False
End Sub

Private Sub Class_Terminate()
   On Error Resume Next
   Debug.Print "Terminate VBEventListener"
End Sub

Public Sub disposing(ByVal source As Object)
    If bQuiet = False Then
    MsgBox "disposing called"
    End If
    bDisposingCalled = True
End Sub

Public Sub setQuiet(quiet As Boolean)
    bQuiet = quiet
End Sub

Public Sub resetDisposing()
    bDisposingCalled = False
End Sub

Public Function disposingCalled()
    disposingCalled = bDisposingCalled
End Function
