= system:shutdown

== Description

Shutdown the Karaf container.

== Syntax

system:shutdown [options] [time] 

== Arguments

|===
|Name |Description

| time
| Shutdown after a specified delay. The time argument can have different formats. First, it can be an absolute time in the format hh:mm, in which hh is the hour (1 or 2 digits) and mm is the minute of the hour (in two digits). Second, it can be in the format m (or +m), in which m is the number of minutes to wait. The word now is an alias for 0 (or +0).
|===

== Options

|===
|Name |Description

|-c, --clean, --clean-all, -ca
|Force a clean restart by deleting the data directory

|-h, --halt
|Halt the Karaf container.

|-cc, --clean-cache, -cc
|Force a clean restart by deleting the cache directory

|--help
|Display this help message

|-f, --force
|Force the shutdown without confirmation message.

|-r, --reboot
|Reboot the Karaf container.
|===


