= shell:watch

== Description

Watches & refreshes the output of a command

== Syntax

shell:watch [options] command 

== Arguments

|===
|Name |Description

| command
| The command to watch / refresh
|===

== Options

|===
|Name |Description

|-n, --interval
|The interval between executions of the command in seconds

|--help
|Display this help message

|-a, --append
|The output should be appended but not clear the console
|===


