= log:exception-display

== Description

Displays the last occurred exception from the log.

== Syntax

log:exception-display [options] [logger] 

== Arguments

|===
|Name |Description

| logger
| The name of the logger. This can be ROOT, ALL, or the name of a logger specified in the org.ops4j.pax.logger.cfg file.
|===

== Options

|===
|Name |Description

|--help
|Display this help message
|===


